WeGA, Kurzbeschreibungen von Orten, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Altona; Hamburg-Altona
location: 53.55 9.93333
identifier: 2911296