WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Crémont, Pierre
identifier: 135021685
birth: 1784-06-18, Aurillac
death: 1848-03-12, Tours
sex: m
occupation: Komponist
occupation: Dirigent
occupation: Violinist
residence: St. Petersburg
residence: Paris
residence: Lyon
1803–1817 Dirigent des französ. Theaters in St. Petersburg; 1817–1824 Violinist an der Opéra Comique in Paris; danach Orchesterchef am Théâtre de l'Odéon; ab 1828 Dirigent an der Opéra comique in Paris, ab 1831 am Grand Théâtre in Lyon