WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Croft, William
identifier: 124556566
birth: 1678-12-30, Nether Ettington, Warkwickshire
death: 1727-08-14, Bath
sex: m
occupation: Organist
occupation: Komponist
residence: London