WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Bignon, Louis Pierre Édouard de
identifier: 10004106X
birth: 1771-01-03, La Mailleraye-sur-Seine
death: 1841-01-06, Paris
sex: m
occupation: Diplomat
occupation: Historiker
residence: Berlin
residence: Kassel
residence: Warschau
residence: Paris