WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Bohák, Johann; Bohack, Johann
birth: 1755-06-03, Neganitz (Böhmen)
death: 1805-11-14, Wien
sex: m
occupation: Klavierbauer
occupation: Orgelbauer
residence: Wien