WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Busby, Thomas
identifier: 1055142363
identifier: BachDigitalPerson_agent_00001639
birth: 1755-12-26, Westminster, London
death: 1838-05-28, Pentonville
sex: m
occupation: Komponist
occupation: Organist
residence: London