WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Fischer, Michael Gotthard
identifier: 116560193
identifier: BachDigitalPerson_agent_00002139
birth: 1773-06-03, Alach
death: 1829-01-12, 1829-01-14, Erfurt
sex: m
occupation: Organist
residence: Erfurt
Ab 1809 Organist der Predigerkirche in Erfurt.