WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Friedrich II., Herzog von Sachsen-Gotha-Altenburg
identifier: 102109117
birth: 1676-07-28, Gotha
death: 1732-03-23, Altenburg
sex: m
residence: Gotha