WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Gerlach, Theodor Christian
identifier: BachDigitalPerson_agent_00002335
birth: 1694-12-14, Rochlitz
death: 1768-11-10, Rochlitz
sex: m
occupation: Organist
residence: Rochlitz
ab 1716 Organist der Kunigundenkirche in Rochlitz