WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Jimmerthal, Hermann; Jimmerthal, Johann Hermann Thomas
identifier: 135203023
identifier: BachDigitalPerson_agent_00000382
birth: 1809-08-14, Lübeck
death: 1886-09-17, Lübeck
sex: m
occupation: Pädagoge
occupation: Organist
occupation: Komponist
residence: Lübeck
Ab 1845 Organist der Marienkirche in Lübeck.