WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Quehl, Hieronymus Florentinus
identifier: 119500264
identifier: BachDigitalPerson_agent_00004129
birth: 1694-05-11, Zella
death: 1739-03-27, Fürth
sex: m
occupation: Organist
occupation: Kantor
occupation: Komponist
residence: Suhl
residence: Marktbreit am Main
residence: Fürth