WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Muffat, Gottlieb; Muffat, Gottlieb Theophil
identifier: 119149397
identifier: BachDigitalPerson_agent_00003769
birth: 1690-04-25, Passau
death: 1770-12-09, Wien
sex: m
occupation: Organist
occupation: Komponist
residence: Wien