WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Reutter, Georg
identifier: 104038187
identifier: BachDigitalPerson_agent_00004224
birth: 1656-11-04, Wien
death: 1738-08-29, Wien
sex: m
occupation: Organist
occupation: Theorbist
occupation: Kapellmeister
occupation: Komponist
residence: Wien