WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Scherer, Friedrich
identifier: 129712671
identifier: BachDigitalPerson_agent_00004495
sex: m
occupation: Orgelbauer
residence: Hamburg