WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Schweinitz, Johann Friedrich
identifier: 140172319
identifier: BachDigitalPerson_agent_00004734
birth: 1708-07-16, Friedebach
death: 1780-07-10, Pyrmont
sex: m
occupation: Organist
occupation: Kantor
occupation: Musikdirektor
residence: Göttingen