WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Sichart, Lorenz
identifier: 132511231
identifier: BachDigitalPerson_agent_00000876
birth: 1694-12-12, Nürnberg
death: 1771-05-06, Nürnberg
sex: m
occupation: Organist
occupation: Komponist
residence: Nürnberg
Organist der Frauenkirche in Nürnberg