WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Steiger, Renate; Ackermann, Renate
identifier: 122626370
identifier: BachDigitalPerson_agent_00004923
birth: 1934, Hamburg
death: 2006-11-19, Heidelberg
sex: f
occupation: Theologin
occupation: Musikwissenschaftlerin
residence: Heidelberg