WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Stransky, Joseph [81jährig, 43 Jahre lang Erster Cellist des Hofopernorchesters Wien]