WeGA, Rezeptionsdokumente, Digitale Edition
author: Anonymus
source date: 20. Mai 1826
language: en
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Covent Garden Theatre.

Oberon, with little interruption, has now been presented twentyeight times, and certainly has lost no part of its well deserved popularity. The house last night, was very well attended. [...]