WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Cherubini, Luigi
identifier: 118520377
birth: 1760-09-08, 1760-09-14, Florenz
death: 1842-03-15, Paris
sex: m
occupation: Komponist
residence: Paris