WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Hérold, Louis Joseph Fernand
identifier: 118774204
birth: 1791-01-28, Paris
death: 1833-01-19, Neuilly-sur-Seine
sex: m
occupation: Komponist
residence: Paris
residence: Rom
residence: Neapel