WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Horsley, William
identifier: 117010480
birth: 1774-11-15, 1774-11-18, London
death: 1858-06-12, London
sex: m
occupation: Organist
occupation: Komponist
residence: London
Professor für Orgel an der Royal Academy of Music