WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Bonoldi, Claudio
birth: 1783-01-01/1783-12-31, Piacenza
death: 1846-02-01/1846-02-28, Mailand
sex: m
occupation: Tenor
residence: Italien