WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Creigh, Rory; Creigh, Robert
sex: m
occupation: Musikwissenschaftler
occupation: Musiker (u. a. Gitarrist)
residence: Tallahassee
residence: Sandpoint
- Master of Music an der Western Washington University (2019), musikwissenschaftliche Dissertation an der Florida State University (2023)
- drei Jahre Dozent an der Florida State University
- danach Lehrkraft am Music Conservatory of Sandpoint