WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

116560193 BachDigitalPerson_agent_00002139 Fischer, Michael Gotthard [Ab 1809 Organist der Predigerkirche in Erfurt.]