WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Fuller-Maitland, John Alexander
identifier: 116871733
identifier: BachDigitalPerson_agent_00002270
birth: 1856-04-07, London
death: 1936-03-30, Carnforth
sex: m
occupation: Musikwissenschafter
occupation: Pianist