WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Herter, Christian Archibald
identifier: 120309823
identifier: BachDigitalPerson_agent_00002748
birth: 1895-03-28, Paris
death: 1966-12-30, Washington D. C.
sex: m
occupation: Politiker
occupation: Diplomat
residence: Berlin
residence: Boston (MA)
residence: Washington D. C.