WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Hill, Richard Synyer
identifier: 118980009
identifier: BachDigitalPerson_agent_00002778
birth: 1901-09-25, Chicago
death: 1961-02-07, Naples (Florida)
sex: m
occupation: Musikbibliothekar
residence: Washington D. C.