WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Naylor, Edward Woodall
identifier: 127028137
identifier: BachDigitalPerson_agent_00003842
birth: 1867-02-09, Scarborough
death: 1934-04-07, Cambridge
sex: m
occupation: Organist
occupation: Komponist
occupation: Musikpädagoge
residence: London