WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Pisendel, Johann Georg
identifier: 11946912X
identifier: BachDigitalPerson_agent_00004048
birth: 1687-12-26, Cadolzburg
death: 1755-11-25, Dresden
sex: m
occupation: Geiger
occupation: Komponist
residence: Ansbach
residence: Leipzig
residence: Dresden
Ab 1712 Violinist der Hofkapelle in Dresden.