WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Raugel, Félix
identifier: 116364793
identifier: BachDigitalPerson_agent_00004164
birth: 1881-11-27, Saint-Quentin
death: 1975-12-30, Paris
sex: m
occupation: Dirigent
occupation: Organist
occupation: Musikwissenschaftler
residence: Paris