WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

135294835 BachDigitalPerson_agent_00004286 Ringk, Johannes [Ab 1755 Organist der Marienkirche in Berlin.]