WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Reißiger, Friedrich August; Reissiger, Friedrich August
identifier: 116444436
birth: 1809-07-26, Belzig
death: 1883-03-02, Fredrikshald (Norwegen)
sex: m
occupation: Komponist
occupation: Organist
occupation: Kapellmeister
occupation: Musikpädagoge
residence: Berlin
residence: Christiania
residence: Halden
Bruder von Karl Gottlieb Reissiger.