WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Taylor, Stainton de Boufflers; Boufflers Taylor, Stainton de
identifier: 108989368X
identifier: BachDigitalPerson_agent_00005042
birth: 1903-09-12
death: 1975-02-02
sex: m
occupation: Organist