WeGA, Personenbiogramme, Digitale Edition
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Stransky, Joseph
birth: 1810-08-09, Wien
death: 1890-12-01/1890-12-31, Wien
sex: m
occupation: Cellist
occupation: Komponist
residence: Wien
81jährig, 43 Jahre lang Erster Cellist des Hofopernorchesters Wien