WeGA, Rezeptionsdokumente, Digitale Edition
author: Anonymus
source date: 5. Mai 1826
language: en
availability: Creative Commons Attribution 4.0 International (CC BY 4.0) (http://creativecommons.org/licenses/by/4.0/)

Covent Garden Theatre.

Oberon was last night performed before a brilliant and crowded audience. An accident was anticipated, in consequence of some mismanagment, which caused a cloud to lower itself with force, in the descent of Mr. C. Bland and Miss Smith, prior to the last scene. [...]